(GeV) s 210^310^410

(mb)

INEL σ

0

20

40

60

80

pp ALICE pp TOTEM pp ATLAS pp CMS pp pp

Gotsman et al. Goulianos Kaidalov et al. Ostapchenko Ryskin et al.